From 26bf48bab8f6ca72d20f5375a4cbc02dbefcb359 Mon Sep 17 00:00:00 2001
From: Mike Gabriel <mike.gabriel@das-netzwerkteam.de>
Date: Thu, 23 Jun 2016 10:31:42 +0200
Subject: library-cleanup: Don't build libNX_Xau anymore. Use system's libXau
 shared library.

---
 nx-X11/config/cf/host.def | 4 ----
 1 file changed, 4 deletions(-)

(limited to 'nx-X11/config/cf/host.def')

diff --git a/nx-X11/config/cf/host.def b/nx-X11/config/cf/host.def
index f1737a998..76f2f6e8b 100644
--- a/nx-X11/config/cf/host.def
+++ b/nx-X11/config/cf/host.def
@@ -411,8 +411,6 @@ XCOMM $XFree86: xc/config/cf/xf86site.def,v 3.186 2003/06/25 18:06:22 eich Exp $
 #define BuildXKB		YES
 #define BuildXKBlib		YES
 
-#define SharedLibXau		YES
-
 /*
  * If you are running NetBSD 0.9C or later, and have the aperture driver
  * installed, uncomment this.
@@ -563,7 +561,5 @@ XCOMM $XFree86: xc/config/cf/xf86site.def,v 3.186 2003/06/25 18:06:22 eich Exp $
 #define X86EMU_LIBPATH /usr/local/lib
  */ 
 
-#define SharedLibXau           YES
-
 #define BuildRman NO
 #define BuildLoadableXlibI18n NO
-- 
cgit v1.2.3

