From 2646fc254e75c4a7fc10d03d1139d0bd708ceae9 Mon Sep 17 00:00:00 2001
From: Mike Gabriel <mike.gabriel@das-netzwerkteam.de>
Date: Sun, 26 Jun 2016 01:51:18 +0200
Subject: nx-X11/programs/Xserver: Drop {X,x}alloc() macros, use malloc()
 instead.

---
 nx-X11/config/cf/xorgsite.def | 19 -------------------
 1 file changed, 19 deletions(-)

(limited to 'nx-X11/config/cf/xorgsite.def')

diff --git a/nx-X11/config/cf/xorgsite.def b/nx-X11/config/cf/xorgsite.def
index 8a0c805c2..86b6abdbc 100644
--- a/nx-X11/config/cf/xorgsite.def
+++ b/nx-X11/config/cf/xorgsite.def
@@ -162,25 +162,6 @@ XCOMM $XFree86: xc/config/cf/xf86site.def,v 3.186 2003/06/25 18:06:22 eich Exp $
 #define LinuxClibMinorVersion	4
  */
 
-/*
- * If you want to use the GNU malloc library, uncomment this
- *
-#define UseGnuMalloc		YES
- */
-
-/*
- * Set this to whatever is required to access the GNU malloc library.
- * The default is '-lgmalloc' unless is specified in the OS's .cf file.
- *
-#define GnuMallocLibrary	-L/usr/local/lib -lgmalloc
- */
-
-/*
- * To enable the internal Xserver malloc, uncomment this
- *
-#define UseInternalMalloc	YES
- */
-
 /*
  * Some Linux releases don't have a libtermcap.  In this case you may need
  * to uncomment the following
-- 
cgit v1.2.3

